en	Did you check your conversion rate lately?

en	How about some seasonal discounts?

en	Have you checked your [1][2]abandoned carts[/2][/1]?[3]Your next order could be hiding there!

en	Have you sent any acquisition email lately?

en	Are you active on social media these days?

en	Have you considered selling on marketplaces?

en	That's more time for something else!

en	No news is good news, isn't it?

en	Seems like all your customers are happy :)

en	An error occurred while updating new window property.

en	An error occurred while updating the new window property for this object.

en	Orders[1][/1]

en	Customers[1][/1]

en	Messages[1][/1]

en	from

en	No new order for now :(

en	No new customer for now :(

en	No new message for now.

en	registered

en	Your shop is in debug mode.

en	All the PHP errors and messages are displayed. When you no longer need it, [1]turn off[/1] this mode.

en	Your shop is in maintenance.

en	Your visitors and customers cannot access your shop while in maintenance mode.%s To manage the maintenance settings, go to Shop Parameters > Maintenance tab.